drop database if exists registry;
create database registry charset = utf8;

use registry;

create table access (
 access_id int NOT NULL AUTO_INCREMENT,
 access_code char(1),
 comment varchar (30),
 primary key (access_id)
);

insert into access (access_code, comment) values 
('M', 'Management access for project'),
('R', 'Read access for project'),
('W', 'Write access for project'),
('D', 'Delete access for project'),
('S', 'Search access for project');


create table role (
 role_id int NOT NULL AUTO_INCREMENT,
 role_mask int DEFAULT 0 NOT NULL,
 role_code varchar(20),
 name varchar (20),
 primary key (role_id)
);
/*
role mask is used for future enhancement when a project member can have multi-roles
currently set to 0
*/

insert into role (role_code, name) values 
('MDRWS', 'projectAdmin'),
('RWS', 'developer'),
('RS', 'guest');


create table user (
 user_id int NOT NULL AUTO_INCREMENT,
# The max length of username controlled by API is 20, 
# and 11 is reserved for marking the deleted users.
# The mark of deleted user is "#user_id".
# The 11 consist of 10 for the max value of user_id(4294967295)  
# in MySQL and 1 of '#'.
 username varchar(255),
# 11 bytes is reserved for marking the deleted users.
 email varchar(255),
 password varchar(40) NOT NULL,
 realname varchar (255) NOT NULL,
 comment varchar (30),
 deleted tinyint (1) DEFAULT 0 NOT NULL,
 reset_uuid varchar(40) DEFAULT NULL,
 salt varchar(40) DEFAULT NULL,
 sysadmin_flag tinyint (1),
 creation_time timestamp,
 update_time timestamp,
 primary key (user_id),
 UNIQUE (username),
 UNIQUE (email)
);

insert into user (username, email, password, realname, comment, deleted, sysadmin_flag, creation_time, update_time) values 
('admin', 'admin@example.com', '', 'system admin', 'admin user',0, 1, NOW(), NOW()),
('anonymous', 'anonymous@example.com', '', 'anonymous user', 'anonymous user', 1, 0, NOW(), NOW());
                                                                          
create table project (
 project_id int NOT NULL AUTO_INCREMENT,
 owner_id int NOT NULL,
 # The max length of name controlled by API is 30, 
 # and 11 is reserved for marking the deleted project.
 name varchar (41) NOT NULL,
 creation_time timestamp,
 update_time timestamp,
 deleted tinyint (1) DEFAULT 0 NOT NULL,
 primary key (project_id),
 FOREIGN KEY (owner_id) REFERENCES user(user_id),
 UNIQUE (name)
);

insert into project (owner_id, name, creation_time, update_time) values 
(1, 'library', NOW(), NOW());

create table project_member (
 project_id int NOT NULL,
 user_id int NOT NULL,
 role int NOT NULL,
 creation_time timestamp,
 update_time timestamp,
 PRIMARY KEY (project_id, user_id),
 FOREIGN KEY (role) REFERENCES role(role_id),
 FOREIGN KEY (project_id) REFERENCES project(project_id),
 FOREIGN KEY (user_id) REFERENCES user(user_id)
 );

insert into project_member (project_id, user_id, role, creation_time, update_time) values
(1, 1, 1, NOW(), NOW());

create table project_metadata (
 project_id int NOT NULL,
 name varchar(255) NOT NULL,
 value varchar(255),
 creation_time timestamp default CURRENT_TIMESTAMP,
 update_time timestamp default CURRENT_TIMESTAMP on update CURRENT_TIMESTAMP,
 deleted tinyint (1) DEFAULT 0 NOT NULL,
 PRIMARY KEY (project_id, name),
 FOREIGN KEY (project_id) REFERENCES project(project_id)
);

insert into project_metadata (project_id, name, value, creation_time, update_time, deleted) values
(1, 'public', 'true', NOW(), NOW(), 0);

create table access_log (
 log_id int NOT NULL AUTO_INCREMENT,
 username varchar (255) NOT NULL,
 project_id int NOT NULL,
 repo_name varchar (256), 
 repo_tag varchar (128),
 GUID varchar(64), 
 operation varchar(20) NOT NULL,
 op_time timestamp,
 primary key (log_id),
 INDEX pid_optime (project_id, op_time)
);

create table repository (
 repository_id int NOT NULL AUTO_INCREMENT,
 name varchar(255) NOT NULL,
 project_id int NOT NULL,
 description text,
 pull_count int DEFAULT 0 NOT NULL,
 star_count int DEFAULT 0 NOT NULL,
 creation_time timestamp default CURRENT_TIMESTAMP,
 update_time timestamp default CURRENT_TIMESTAMP on update CURRENT_TIMESTAMP,
 primary key (repository_id),
 UNIQUE (name)
);

create table replication_policy (
 id int NOT NULL AUTO_INCREMENT,
 name varchar(256),
 project_id int NOT NULL,
 target_id int NOT NULL,
 enabled tinyint(1) NOT NULL DEFAULT 1,
 description text,
 deleted tinyint (1) DEFAULT 0 NOT NULL,
 cron_str varchar(256),
 filters varchar(1024),
 replicate_deletion tinyint (1) DEFAULT 0 NOT NULL,
 start_time timestamp NULL,
 creation_time timestamp default CURRENT_TIMESTAMP,
 update_time timestamp default CURRENT_TIMESTAMP on update CURRENT_TIMESTAMP,
 PRIMARY KEY (id)
 );

create table replication_target (
 id int NOT NULL AUTO_INCREMENT,
 name varchar(64),
 url varchar(64),
 username varchar(255),
 password varchar(128),
 /*
 target_type indicates the type of target registry,
 0 means it's a harbor instance,
 1 means it's a regulart registry
 */
 target_type tinyint(1) NOT NULL DEFAULT 0,
 insecure tinyint(1) NOT NULL DEFAULT 0,
 creation_time timestamp default CURRENT_TIMESTAMP,
 update_time timestamp default CURRENT_TIMESTAMP on update CURRENT_TIMESTAMP,
 PRIMARY KEY (id)
 );

create table replication_job (
 id int NOT NULL AUTO_INCREMENT,
 status varchar(64) NOT NULL,
 policy_id int NOT NULL,
 repository varchar(256) NOT NULL,
 operation  varchar(64) NOT NULL,
 tags   varchar(16384),
 creation_time timestamp default CURRENT_TIMESTAMP,
 update_time timestamp default CURRENT_TIMESTAMP on update CURRENT_TIMESTAMP,
 PRIMARY KEY (id),
 INDEX policy (policy_id),
 INDEX poid_uptime (policy_id, update_time)
 );
 
create table img_scan_job (
 id int NOT NULL AUTO_INCREMENT,
 status varchar(64) NOT NULL,
 repository varchar(256) NOT NULL,
 tag   varchar(128) NOT NULL,
 digest varchar(128),
 creation_time timestamp default CURRENT_TIMESTAMP,
 update_time timestamp default CURRENT_TIMESTAMP on update CURRENT_TIMESTAMP,
 PRIMARY KEY (id)
 );

create table img_scan_overview (
 id int NOT NULL AUTO_INCREMENT,
 image_digest varchar(128) NOT NULL,
 scan_job_id int NOT NULL,
 /* 0 indicates none, the higher the number, the more severe the status */
 severity int NOT NULL default 0,
 /* the json string to store components severity status, currently use a json to be more flexible and avoid creating additional tables. */
 components_overview varchar(2048),
 /* primary key for querying details, in clair it should be the name of the "top layer" */
 details_key varchar(128),
 creation_time timestamp default CURRENT_TIMESTAMP,
 update_time timestamp default CURRENT_TIMESTAMP on update CURRENT_TIMESTAMP,
 PRIMARY KEY(id),
 UNIQUE(image_digest)
 );

create table clair_vuln_timestamp (
id int NOT NULL AUTO_INCREMENT, 
namespace varchar(128) NOT NULL,
last_update timestamp NOT NULL,
PRIMARY KEY(id),
UNIQUE(namespace)
);

create table properties (
 k varchar(64) NOT NULL,
 v varchar(128) NOT NULL,
 primary key (k)
 );

CREATE TABLE IF NOT EXISTS `alembic_version` (
    `version_num` varchar(32) NOT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

insert into alembic_version values ('1.2.0');
